---
sidebar_position: 0
title: "🌐 Browser Compatibility"
---

Open WebUI is designed for and tested on modern browsers. To ensure the best experience, we recommend using the following browser versions or later:

## 🚀 Supported Browsers

Open WebUI's core functionality specifically depends on these browser versions:

- **Chrome 111** 🟢 _(Released March 2023)_
- **Safari 16.4** 🍏 _(Released March 2023)_
- **Firefox 128** 🔥 _(Released July 2024)_

💡 If you experience any issues, ensure your browser is up to date or try an alternative supported browser.
